<html><head><meta name="color-scheme" content="light dark"></head><body><pre style="word-wrap: break-word; white-space: pre-wrap;"># $FreeBSD$

# This is our first version; it depends on no other.
FBSD_1.0 {
};

# This is our private namespace.  Any global interfaces that are
# strictly for use only by other FreeBSD applications and libraries
# are listed here.  We use a separate namespace so we can write
# simple ABI-checking tools.
FBSDprivate {
};
</pre></body></html>